Title: Week 08 Resources
Course: AIINFRA 303: Capstone Project > Section: Week 08 — Design Review and Working Vertical Slice

📚 Resources

- Title: Design review checklist using ADRs + C4 diagrams: https://www.catio.tech/blog/architecture-decision-record
- Title: GitHub Projects status field for tracking: https://docs.github.com/en/issues/planning-and-tracking-with-projects/learning-about-projects/about-projects
- Title: Kubernetes: Hello Minikube tutorial: https://kubernetes.io/docs/tutorials/hello-minikube/
- Title: Deploying Your First App on Kubernetes (Minikube & Kind): https://dev.to/emmsddev/deploying-your-first-app-on-kubernetes-a-beginners-guide-minikube-kind-3654
- Title: C4 Model — Introduction: https://c4model.com/introduction
- Title: Docker Docs — Get Started: https://docs.docker.com/get-started/

Week 09 · The Model Layer: Serving, Adaptation, or RAG Integration

Notion ID: 392c08fd-0278-8192-9367-fc106897650c Notion URL: https://app.notion.com/p/392c08fd027881929367fc106897650c